Figure 3. Station relaxation amplitudes by adjustment and by prediction from model A. Solid lines are the fault patches in the model. Arrows with an error ellipse are from the adjustment; thick arrows without an ellipse are predicted from model A. Error ellipses are one standard deviation. Good agreement between the two suggests that the postseismic deformation in the rupture zone can be explained by afterslip along the fault surfaces, at and beneath the seismogenic zone.